From 0b262ee13a9028cc581d1412bcbb729eb7c707f5 Mon Sep 17 00:00:00 2001
From: 简律纯 <i@jyunko.cn>
Date: Wed, 14 Jan 2026 14:13:36 +0800
Subject: Update ui/src/components/SettingsView.svelte

Co-authored-by: Copilot <175728472+Copilot@users.noreply.github.com>
---
 ui/src/components/SettingsView.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'ui/src/components/SettingsView.svelte')

diff --git a/ui/src/components/SettingsView.svelte b/ui/src/components/SettingsView.svelte
index dcb947f..801970b 100644
--- a/ui/src/components/SettingsView.svelte
+++ b/ui/src/components/SettingsView.svelte
@@ -136,7 +136,7 @@
           class="bg-zinc-950 text-white w-full p-3 rounded border border-zinc-700 focus:border-indigo-500 outline-none"
         />
         <p class="text-xs text-zinc-500 mt-2">
-          Number of files to download simultaneously. Higher values can speed up downloads but may consume more bandwidth and system resources. Recommended: 16-64 (max: 128 for advanced users)
+          Number of concurrent download threads (1-128). Higher values increase download speed but use more bandwidth and system resources. Default: 32
         </p>
       </div>
     </div>
-- 
cgit v1.2.3-70-g09d2

