From 72a79bd525e72f80c6b46b4514f0e6bb4c3cc07a Mon Sep 17 00:00:00 2001
From: HsiangNianian <i@jyunko.cn>
Date: Sat, 7 Sep 2024 15:15:32 +0800
Subject: refactor(site): move site to HydroRoll-site repo

---
 site/src/App.vue | 7 -------
 1 file changed, 7 deletions(-)
 delete mode 100644 site/src/App.vue

(limited to 'site/src/App.vue')

diff --git a/site/src/App.vue b/site/src/App.vue
deleted file mode 100644
index 88a4d52..0000000
--- a/site/src/App.vue
+++ /dev/null
@@ -1,7 +0,0 @@
-<template>
-    <router-view />
-</template>
-
-<script lang="ts">
-export default {}
-</script>
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

