From 72a79bd525e72f80c6b46b4514f0e6bb4c3cc07a Mon Sep 17 00:00:00 2001
From: HsiangNianian <i@jyunko.cn>
Date: Sat, 7 Sep 2024 15:15:32 +0800
Subject: refactor(site): move site to HydroRoll-site repo

---
 site/src/layouts/default/Default.vue | 12 ------------
 1 file changed, 12 deletions(-)
 delete mode 100644 site/src/layouts/default/Default.vue

(limited to 'site/src/layouts/default/Default.vue')

diff --git a/site/src/layouts/default/Default.vue b/site/src/layouts/default/Default.vue
deleted file mode 100644
index e642631..0000000
--- a/site/src/layouts/default/Default.vue
+++ /dev/null
@@ -1,12 +0,0 @@
-<template>
-  <v-app>
-    <default-bar />
-
-    <default-view />
-  </v-app>
-</template>
-
-<script lang="ts" setup>
-  import DefaultBar from './AppBar.vue'
-  import DefaultView from './View.vue'
-</script>
-- 
cgit v1.2.3-70-g09d2

