From 72a79bd525e72f80c6b46b4514f0e6bb4c3cc07a Mon Sep 17 00:00:00 2001
From: HsiangNianian <i@jyunko.cn>
Date: Sat, 7 Sep 2024 15:15:32 +0800
Subject: refactor(site): move site to HydroRoll-site repo

---
 site/src/layouts/default/View.vue | 9 ---------
 1 file changed, 9 deletions(-)
 delete mode 100644 site/src/layouts/default/View.vue

(limited to 'site/src/layouts/default/View.vue')

diff --git a/site/src/layouts/default/View.vue b/site/src/layouts/default/View.vue
deleted file mode 100644
index 8e9e414..0000000
--- a/site/src/layouts/default/View.vue
+++ /dev/null
@@ -1,9 +0,0 @@
-<template>
-  <v-main>
-    <router-view />
-  </v-main>
-</template>
-
-<script lang="ts" setup>
-  //
-</script>
-- 
cgit v1.2.3-70-g09d2

