From b336845dac0567bfce09dc0d4ffd6e27b1bc3d66 Mon Sep 17 00:00:00 2001
From: Ntkskwk <natsukawa247@outlook.com>
Date: Tue, 3 Sep 2024 15:55:35 +0800
Subject: refactor: Optimize the cache of changelog

---
 site/src/views/index/Right.vue | 10 +++++++---
 1 file changed, 7 insertions(+), 3 deletions(-)

(limited to 'site/src/views/index/Right.vue')

diff --git a/site/src/views/index/Right.vue b/site/src/views/index/Right.vue
index ba8f294..f87d167 100644
--- a/site/src/views/index/Right.vue
+++ b/site/src/views/index/Right.vue
@@ -2,7 +2,7 @@
 import Notepad from './Notepad/index.vue'
 import DocumentationIcon from '@/components/icons/IconDocumentation.vue'
 import { getChangeLog } from './Notepad/changelog'
-
+import { computed } from 'vue'
 
 export default {
   data() {
@@ -47,13 +47,17 @@ export default {
     }
   },
   beforeCreate() {
-    getChangeLog().then(res => {
+    changeLogMessage.value.then((res) => {
       this.changeLogMessage = res;
       this.change_page(this.mainPage);
-    })
+    });
   },
 }
 
+const changeLogMessage = computed(() => {
+    return getChangeLog();
+})
+
 </script>
 
 <template>
-- 
cgit v1.2.3-70-g09d2

