| option      | description                              |
| ----------- | ---------------------------------------- |
| full        | This is the default. Displays all output |
| hash-only   | Show only the hashes of the tasks        |
| new-only    | Only show output from cache misses       |
| errors-only | Only show output from task failures      |
| none        | Hides all task output                    |
